= cryptsetup-refresh(8)
:doctype: manpage
:manmanual: Maintenance Commands
:mansource: cryptsetup {release-version}
:man-linkstyle: pass:[blue R < >]
:COMMON_OPTIONS:
:ACTION_REFRESH:

== Name

cryptsetup-refresh - refresh parameters of an active mapping

== SYNOPSIS

*cryptsetup _refresh_ [<options>] <name>*

== DESCRIPTION

Refreshes parameters of active mapping <name>.

Updates parameters of active device <name> without the need to deactivate
the device (and umount filesystem). Currently, it supports parameters
refresh on following devices: LUKS1, LUKS2 (including authenticated
encryption), plain crypt and loop-AES.

Mandatory parameters are identical to those of an open action for
the respective device type.

You may change following parameters on all devices
--perf-same_cpu_crypt, --perf-submit_from_crypt_cpus,
--perf-no_read_workqueue, --perf-no_write_workqueue and
--allow-discards.

Refreshing the device without any optional parameter will refresh the device
with default setting (respective to device type).

*LUKS2 only:*

The --integrity-no-journal parameter affects only LUKS2 devices with
the underlying dm-integrity device.

Adding option --persistent stores any combination of device parameters
above in LUKS2 metadata (only after successful refresh operation).

The --disable-keyring parameter refreshes a device with volume key passed in
dm-crypt driver.

include::man/common_options.adoc[]
include::man/common_footer.adoc[]
