= cryptsetup-luksKillSlot(8)
:doctype: manpage
:manmanual: Maintenance Commands
:mansource: cryptsetup {release-version}
:man-linkstyle: pass:[blue R < >]
:COMMON_OPTIONS:
:ACTION_LUKSKILLSLOT:

== Name

cryptsetup-luksKillSlot - wipe a keyslot from the LUKS device

== SYNOPSIS

*cryptsetup _luksKillSlot_ [<options>] <device> <number>*

== DESCRIPTION

Wipe the keyslot with the number from the LUKS device.
Except running in batch-mode (-q), a remaining passphrase must be supplied, either interactively or via --key-file.
This command can remove the last remaining keyslot, but requires an interactive confirmation when doing so.
Removing the last passphrase makes a LUKS container permanently inaccessible.

*<options>* can be [--key-file, --keyfile-offset, --keyfile-size, --header, --disable-locks, --type, --verify-passphrase, --timeout].

*WARNING:* If you read the passphrase from stdin (without further argument or with '-' as an argument to --key-file), batch-mode (-q) will be implicitly switched on and no warning will be given when you remove the last remaining passphrase from a LUKS container.
Removing the last passphrase makes the LUKS container permanently inaccessible.

*NOTE:* If no passphrase is provided (on stdin or through --key-file argument) and batch-mode (-q) is active, the keyslot is removed without any other warning.

include::man/common_options.adoc[]
include::man/common_footer.adoc[]
