= cryptsetup-luksResume(8)
:doctype: manpage
:manmanual: Maintenance Commands
:mansource: cryptsetup {release-version}
:man-linkstyle: pass:[blue R < >]
:COMMON_OPTIONS:
:ACTION_LUKSRESUME:

== Name

cryptsetup-luksResume - resume a suspended device and reinstate the key

== SYNOPSIS

*cryptsetup _luksResume_ [<options>] <name>*

== DESCRIPTION

Resumes a suspended device and reinstates the encryption key. Prompts
interactively for a passphrase if no token is usable (LUKS2 only) or
--key-file is not given.

*<options>* can be [--key-file, --keyfile-size, --keyfile-offset,
--key-slot, --header, --disable-keyring, --disable-locks, --token-id,
--token-only, --token-type, --disable-external-tokens, --type, --tries,
--timeout, --verify-passphrase, --volume-key-keyring].

include::man/common_options.adoc[]
include::man/common_footer.adoc[]
